HadAT1 gridded dataset coverage

0 90^oE 180 90^oW 0

90^oS

45^oS

0

45^oN

90^oN

HadAT2 gridded dataset coverage

0 90^oE 180 90^oW 0

90^oS

45^oS

0

45^oN

90^oN

1 2 3 4 5 6 7 8