1958 to 2009

90S 45S 0 45N 90N Latitude

1000 850

500

300 200 100

Pressure (hPa)

1979 to 2009

90S 45S 0 45N 90N Latitude

1000 850

500

300 200 100

Pressure (hPa)

-1 -0.5 -0.25 -0.15 -0.1 -0.05 0 0.05 0.1 0.15 0.25 0.5 Trend (K/decade)